[GeV] ππ M 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0

Events / 25 MeV

-0.02

0.00

0.02

0.04

0.06

0.08

0.10

0.12

0.14 610 × H1 ’05 corrected ding Model oS rel. Breit-Wigner Interference term