]^2

|t| [GeV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

]^2 p) /dt [nb/GeV γ→ p ^*γ (σd

-110

1

10 H1 04 Prel. H1 99-00

fit to H1 99-00 & Prel.

-b|t|e -2 0.50 GeV ± 0.27 ± b = 5.83

H1