W [GeV]

40 50 60 70 80 90 100 110 120 130 140 p) [nb] γ→ p ^*γ (σ

0

2

4

6

8

10

12 H1 04 Prel. H1 99-00 Zeus

Color Dipole Model

Favart-Machado BGBK

H1

2 = 8 GeV

2Q_2 |t| < 1 GeV