Total (qqg)_T (qq)_T (qq)_L

BEKW(mod):

H1 data 97 H1 data 99-00 (prelim.) H1 data 2004 (prelim.)

x_{IP}=0.002

H1 Collaboration

0 0.01

0.02

0.03

0.04

0.05

0.06

0.2 0.4 0.6 0.8 1 β x_{IP}σ_r^{D(3)}

Q^2=20 GeV^2

0 0.01

0.02

0.03

0.04

0.05

0.06

0.2 0.4 0.6 0.8 1 β x_{IP}σ_r^{D(3)}

Q^2=35 GeV^2

0 0.01

0.02

0.03

0.04

0.05

0.06

0.2 0.4 0.6 0.8 1 β x_{IP}σ_r^{D(3)}

Q^2=45 GeV^2

0 0.01

0.02

0.03

0.04

0.05

0.06

0.2 0.4 0.6 0.8 1 β x_{IP}σ_r^{D(3)}

Q^2=60 GeV^2