W ΜGeVΝ dσ/dMx Μnb/GeVΝ

H1 Mx 99-00 (prelim.) ZEUS Mx

H1 Collaboration

0 20 40 60 80 100

0 50 100 150 200 250

Mx=6 GeV

Q^2=14 GeV^2

0 20 40 60 80 100

0 50 100 150 200 250

Mx=11 GeV

Q^2=14 GeV^2

0 10 20 30 40

0 50 100 150 200 250

Mx=6 GeV

Q^2=27 GeV^2

0 10 20 30 40

0 50 100 150 200 250

Mx=11 GeV

Q^2=27 GeV^2

0 5 10 15

0 50 100 150 200 250

Mx=6 GeV

Q^2=55 GeV^2

0 5 10 15

0 50 100 150 200 250 300

Mx=11 GeV

Q^2=55 GeV^2