β -2 10^{-1}10

D ccσ _{IP}x

0

0.01

0.02

2 = 35 GeV 2Q = 0.004 IPx

H1 Lifetime Data (Prel.)

Data (Prel.) * H1 D_* ZEUS D NLO QCD (H1 Fit) NLO QCD (H1 Fit B)

β

D

0