β -2 10^{-1}10

D ccf

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5

2 = 35 GeV 2Q = 0.004 IPx

H1 Preliminary NLO QCD (H1 Fit) NLO QCD (H1 Fit B)

β

D

0