x_{IP} =0.001

10^{-3}

10^{-2}

10^{-1}

1

10

10^2

0.5 1 1.5 2 2.5 3 3.5 4

log_{10}(Q^2)

3^i*x_{IP}σ_r^{D(3)}

β=0.8, i=0 β=0.5, i=1 β=0.32, i=2 β=0.2, i=3 β=0.13, i=4 β=0.08, i=5 β=0.05, i=6

Q^2Γ8.5 GeV^2 H1 PRELIMINARY