x_{IP} =0.03

10^{-3}

10^{-2}

10^{-1}

1

10

10^2

10^3

10^4

0.5 1 1.5 2 2.5 3 3.5 4

log_{10}(Q^2)

3^i*x_{IP}σ_r^{D(3)}

β=0.6667, i=0 β=0.4333, i=1 β=0.2667, i=2 β=0.1667, i=3 β=0.1067, i=4 β=0.0667, i=5 β=0.0433, i=6 β=0.0267, i=7 β=0.0167, i=8 β=0.0107, i=9 β=0.0067, i=10 β=0.0043, i=11 β=0.0027, i=12

Q^2Γ8.5 GeV^2 H1 PRELIMINARY