Q, E* (GeV)

10^210

p /dx^± 1/N dn

-210

-110

1

10

210

310

410 H1 Preliminary NLO (FF=kkp) irsafe - e^+e Rapgap range px 0.0 - 0.02 (x30)

0.02 - 0.05 (x5)

0.05 - 0.1 (x2)

0.1 - 0.2 0.2 - 0.3 0.3 - 0.4 0.4 - 0.5

0.5 - 0.7

0.7 - 1.0