)^2

(GeV 2Q 310^410

)^{-2} (pb GeV 2 / d Q

NCσd

-510

-410

-310

-210

-110 1 10 210

H1 Collaboration p (prel.) - H1 2005 e SM (H1 PDF 2000)

Neutral Current

= +37.0 % eP y < 0.9

2

1