)^2

(GeV 2Q 310^410

= -27.0%) e(P_2 dQ σd = +37.0%) / e(P_2 dQ σd

0.4 0.6 0.8 1 1.2 1.4 1.6

H1 Collaboration

Neutral Current

p (prel.) - H1 2005 e

SM (H1 PDF 2000)

Norm. uncert.