0

0.5

1

0 0.1 0.2 0.3 0.4 0.5 0.6

H1 data (prelim.)

Q^2 = 1500 GeV^2 Q^2 = 5000 GeV^2 Q^2 = 12000 GeV^2

H1 PDF 2000

xF_3 ^{γZ}

H1 Preliminary

0 0.25 0.5 0.75

0 0.1 0.2 0.3 0.4 0.5 0.6 transformed to Q^2 = 1500 GeV^2

H1 HERA I+II H1 PDF 2000

x xF_3 ^{γZ}

H1 Collaboration