100 150 200 250 300 350 400 -2 10

-1 10

1

/ GeV LQ M λ

d)νu, ^- (e

0,LS

u)^- (e 0,RS

d)^- (e

0,RS ~ d)νu, ^- d, e^- (e

1,LS ~ ~ ~

Excluded at 95% C.L.

H1 preliminary