) [GeV] +πΛ M( 1.26 1.28 1.3 1.32 1.34 1.36 1.38

Entries / 3 MeV

0 50 100 150 200 250 300 350 400 H1 prelim.

+Ξ_{] < 1202[GeV22 < Q}