Entries / 8 MeV

20 40 60 80 100 120 140 H1 prelim.

] < 120 2 [GeV 2 2 < Q

1.4 1.5 1.6 1.7 1.8 1.9 2 2.1 2.2 0 0.2 0.4 0.6 0.8 1 95 % C.L.

) [GeV] ±π^±Ξ M(

)^±π^±Ξ(_{u.l.}R