HERA I e

+p Neutral Current Scattering - H1 and ZEUS

Q2 / GeV

2σr(x,Q2)x=0.002 x=0.02 x=0.25

HERA Structure Functions Working Group

HERA I (prel.)

ZEUS

H1H1 2000 PDF

ZEUS-JETS

0.20.40.60.81.21.410102103104