(degrees)

bel. Φ 0 20 40 60 80 100 120 140 160 180

)^-σ + ^+σ)/(^-σ - ^+σ BCA = (

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 H1 DVCS Analysis HERA II

H1^{H1 data (prelim.)}_{)bel.Φ cos(1p}