0 2 4 6 8 10 12

0 20 40 60 80 100 120 140

ZEUS HERA I

H1 HERA II e^-p

H1 HERA II e^+p (prelim.) H1 HERA I Q^2 = 8 GeV^2

H1 H1 DVCS Analysis HERA II

W ΜGeVΝ σ_{DVCS} ΜnbΝ