0.5

1

1.5

-4 -3

Q^2=8.5GeV^2

σ_{red}

H1 HERA-II prelim H1 97-00 prelim H1 97 (yΛ0.6)

H1 QCD fit (DESY-00-181) 0.5

1

1.5

-4 -3

Q^2=12.0GeV^2

1

-4 -3

Q^2=15.0GeV^2

H1 Preliminary

0.5

1

1.5

-4 -3

Q^2=20.0GeV^2 0.5

1

1.5

-4 -3

Q^2=25.0GeV^2

1

-4 -3

Q^2=35.0GeV^2

log_{10}x