-1

-0.5

10 -2 10 -1

Q^2=1.2 GeV^2 y dσ/dy

-1

-0.5

0

10 -2 10 -1

Q^2=1.5 GeV^2

0

10 -2 10 -1

Q^2=2 GeV^2

-1

-0.5

0

Q^2=2.5 GeV^2 -1

-0.5

0

Q^2=3.5 GeV^2

0

10^{-2} 10^{-1}

Q^2=5 GeV^2

y

-1

-0.5

0

10^{-2} 10^{-1}

Q^2=6.5 GeV^2 -1

-0.5

0

10^{-2} 10^{-1}

Q^2=8.5 GeV^2

y

H1 Preliminary SVX' 00,MB' 99, MB' 97 comb. Fractal Fit (R=c) Fractal Fit (R=0)