10^{-1}

1

10

10^2

10^3

10^4

10^{-2} 10^{-1} 1 10

W=16GeV_{x2}

W=25GeV_{x4}

W=30GeV_{x8}

W=40GeV_{x16}

W=50GeV_{x32}

W=70GeV_{x64}

W=80GeV_{x128}

W=95GeV_{x256}

W=120GeV

x512

W=150GeV

x1024

W=190GeV

x2048

W=260GeV

x4096

W=285GeV

x8192

Q^2/ GeV^2 σ_{γp}^{eff} / μb

H1 MB’99, SVX’00, MB’97 comb. ZEUS’97 ZEUS BPT’97

Fractal Fit

H1 preliminary