[GeV] eeM 2 3 4 5 6 0 50 100 150 200 250

H1_{preliminary}

H1 data ’04-’06 ee →Ψ inel. J/ 40 ± N = 315 _2 < 100 GeV 2 3.6 < Q 0.3 < z < 0.9

< 225 GeV pγ 50 < W