]^2

[GeV *2 TP 0 20 40 60 80 100

]^2 [pb/GeV *2 T /dP σd

-4 10 -2 10 1 210 410_{0.3 < z < 0.6 (x100)}

0.6 < z < 0.75 0.75 < z < 0.9 (x0.01) CASCADE (x0.5) EPJPSI (x1.4)

H1_{preliminary}