) [GeV] π ) - M(K ππ M(K 0.14 0.15 0.16 0.17

Entries / 0.5 MeV

1000

2000

3000

π

3000^{+π-,K-π+K}_π

wrong charge K

H1 preliminary HERA II 04-06

2 < 100 GeV 2 5 < Q 0.05 < y < 0.6 (D*) | < 1.5 η | (D*) > 1.5 GeV t p