(D*)[GeV] p 10

[nb/GeV] T eD*X)/ dp → (ep σd

-2 10

-1 10

1

10^{H1 preliminary}

HERA II 04-06

p

T →

1

10^{H1 data}_{RAPGAP}

CASCADE HVQDIS <1.6 GeV c 1.3<m c 2 +4 m 2 =Q r 2μ=_f^2μ μ < 2 μ < μ 0.5 (Peterson)=0.045 ε

2 < 100 GeV 2 5 < Q 0.05 < y < 0.6 (D*) | < 1.5 η | (D*) > 1.5 GeV Tp