[GeV] μμm 2 3 4 5 6 events

0

200

400

600 2006-2007 data μμ→Ψ inel. J/ 55 ± N = 2410 _2

~ 0 GeV 2Q 0.3 < z < 0.9 1 GeV

≥ _{ψT,}P

H1_{preliminary}