[GeV] pγW 100 150 200

X) [nb] ψ J/ →pγ (σ

0

20

40

60

H1 data ’06-’07 H1 (HERA I) CSM NLO CASCADE (x1.05) EPJPSI (x1.25)

H1_{preliminary}

0