1

10

10^2

10^2

W [GeV] σ_{γ∗p 5 ϕp} ΜnbΝ

Fit ∝ W^δ

H1 ϕ electroproduction (preliminary) Q^2 [GeV^2]

H1 HERA-1 prel. 3.3 6.5 16.5