y 0.2 0.4 0.6

X)/dy [nb] Λ→ (ep σd

0 5 10 15 20 25 30 =0.3)_sλCDM (

=0.22) sλ CDM ( =0.22) sλ MEPS (

H1 HERA I Prel.