Breit, current px 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

)_Λ + N Λ ) / (N

Λ- N Λ(N

-0.2

-0.1 0 0.1 0.2 H1 HERA I Prel.