]° [^{±, h1Jet}ϕΔ

0 50 100 150 200 250 300 350

〉 charged N〈

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 H1 Data (prel.) Pythia MI Pythia NMI

H1 Preliminary

> 0.7 obs γx