20 40 60 0

0.5

1 H1 (Prelim.) H1 PDF 2000 MSTW

= 460, 575, 920 GeV pE

0.00028 0.00036 0.00050 0.00063

0.00095

0.00135

0.00207

x

L H1 Preliminary F

2 medium Q

)^2

(x, Q LF

2 / GeV 2Q

0

1