1 1.2 1.4

0.5 1

y^2/Μ 1 + ( 1 - y )^2 Ν σ_r

x=0.0028

1 1.2 1.4

0.5 1

y^2/Μ 1 + ( 1 - y )^2 Ν σ_r

x=0.0031

1 1.2 1.4

0.5 1

y^2/Μ 1 + ( 1 - y )^2 Ν σ_r

x=0.0035

1 1.2 1.4

0.5 1

y^2/Μ 1 + ( 1 - y )^2 Ν σ_r

x=0.0039

1 1.2 1.4

0.5 1

y^2/Μ 1 + ( 1 - y )^2 Ν σ_r

x=0.0045

1 1.2 1.4

0.5 1

y^2/Μ 1 + ( 1 - y )^2 Ν σ_r

x=0.006

E_p=920 GeV E_p=575 GeV E_p=460 GeV Linear fit

H1 Preliminary Q^2 = 150 GeV^2

High Q^2