10^210^310

-0.5

0

0.5

1

1.5 H1 (Prelim.) H1 PDF 2000

= 460, 575, 920 GeV pE

0.00028 0.00037 0.00049 0.00063

0.00090 0.00114 0.00148

0.00235 0.00269 0.00374 0.00541 0.00689 0.00929 0.01256 0.02178 0.02858 0.03531

x

L H1 Preliminary F

2 medium & high Q

)^2

(x, Q LF

2 / GeV 2Q -0.5

0

1

1.5