’/GeV eE 5 10 15 20 25 30

e, MC

/ E’

e, Data E’

0.97

0.98

0.99 1 1.01

1.02

1.03_{Kinematic Peak}

Compton Electrons Ψ J/ Calibration 0π

SpaCal Calibration - H1 Preliminary