H1PDF-HERA-I Fit (prel.) H1PDF-HERA-I Fit extrapolated (prel.) H1 Data (prel.) Data (prel.) 2 H1 Low Q 2 / GeV 2Q 1 10 100 0

0.2

0.4 0.6 x = 0.08

1 10 100 0 0.2 0.4 0.6 x = 0.05 2

/ GeV 2Q 1 10 100 0

0.2

0.4 0.6 x = 0.032

1 10 100 0

0.2

0.4 0.6 x = 0.02

1 10 100 0

0.2

0.4 0.6 x = 0.013

1 10 100

0

0.2

0.4 0.6 x = 0.008

1 10 100 0 0.2 0.4 0.6 x = 0.005

1 10 100

0

0.2

0.4 0.6 x = 0.0032

1 10 100

0

0.2

0.4 0.6 x = 0.002

1 10 100

0

0.2

0.4 0.6 x = 0.0013

1 10 100

0

0.2

0.4 0.6 x = 0.0008

1 10 100 0 0.2 0.4 0.6 x = 0.0005

1 10 100

0

0.2

0.4 0.6 x = 0.00032

1 10 100

0

0.2

0.4 0.6 x = 0.0002

1 10 100

0

0.2

0.4 0.6 x = 0.00013

1 10 100

0

0.2

0.4 0.6 x = 0.00008

1 10 100 0 0.2 0.4 0.6 x = 0.00005

H1 Preliminary x)^2 ln Q

∂ / _2 F∂(