) [GeV] π M(K 1.6 1.8 2 2.2

Entries / 10 MeV

0

1000

2000

3000

4000

+π^- + K -π^+K π wrong charge K

H1 Preliminary

HERA II

2 < 100 GeV 2 5 < Q 0.02 < y < 0.7

(D*)| < 1.5 η| (D*) > 1.5 GeV Tp