]^2

[GeV 2Q 6 7 8 910 20 30 40 50 60^210

]^2 [nb/GeV 2 eD*X) / dQ → (ep σd

-2 10

-1 10

1

2 →

1 H1 data (prel.) RAPGAP (CTEQ65m) RAPGAP (CTEQ6ll) CASCADE (A0)

H1 Preliminary HERA II

0.02 < y < 0.7 (D*)| < 1.5 η| (D*) > 1.5 GeV Tp

D* in DIS

[GeV] 2Q 6 7 8 910 20 30 40 50 60^210

R

0.8 1 1.2

R

1 1.2^{calctot,vis} σ/ data tot,vis σ MC scaled by