[GeV] pγW 100 150 200 250

[nb/GeV] pγ eD*X)/dW → (ep σd

0 0.1 0.2 0.3 0.4 0.5 0.6 H1 data (prel.) FMNR (CTEQ5f3)

< 1.7 GeV c 1.3 < m 2 t+p^2_c=m 2 0μ < 4 0μ/_fμ

1 < < 2 0μ/_rμ

0.5 <

H1 Preliminary HERA II

D* in Photoproduction

2 < 2 GeV 2Q < 285 GeV Pγ 100 < W

(D*) > 1.8 GeV tp (D*)| < 1.5 η|