) [GeV] π )-M(K ππ M(K 0.135 0.14 0.145 0.15 0.155 0.16 0.165 0.17

Entries / 0.5 MeV

20 40 60 80 100 120 140 160 180 200 220 2 D* production at high Q ± slow

π ^±π ^+K π wrong charge K 37 ± fit: N(D*) = 497

H1 Preliminary HERA II

2 < 1000 GeV 2 100 < Q 0.02 < y < 0.7

(D*) | < 1.5 η| (D*) > 1.5 GeV Tp