[ GeV ] D* MΔ 0.135 0.14 0.145 0.15 0.155 0.16 0.165 0.17

Entries per 0.5 MeV

0 1000

2000

3000

4000

5000

0 0 0

± sπ ^±π ^+K wrong charge D

HERA II data

194 ± N(D*) = 15576

H1 Preliminary