M(D*p) [ GeV ]

2.9 3 3.1 3.2 3.3 3.4 3.5 3.6

Entries per 10 MeV

0 10 20 30 40 50 60

p ^+ p + D* -D* wrong charge D D* Monte Carlo

0

HERA II data

high proton momentum

H1 Preliminary