) [GeV] π )-m(K sππ =m(K ± D* MΔ 0.14 0.15 0.16 0.17

events / 500keV

0

200

400

600

800

π ± 0

800 Data (RCC) Data (WCC) fit

89 ± = 2865 ± D*N

H1 Preliminary