m(ππ) ΜGeVΝ normalised entries per 25 MeV

H1 Data Prel. PYTHIA 6.2 with BEC PYTHIA 6.2 without BEC

H1 Preliminary

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.45 0.55 0.65 0.75 0.85 0.95 1.05