) [GeV]

-π^+π M ( 0.4 0.45 0.5 0.55 0.6

Entries / 4.0 MeV

20 40 60 80 100 120 140 160 180 310 × H1 Data (Prel.) s 0 Invariant mass spectrum of K H1 Preliminary HERA II