F^{cc} _ 2 in the NLO DGLAP scheme (HVQDIS)

F_2^{cc–}_{Q =2}

0

0.2

0.4

0.6 7 GeV^2 11GeV^2 18GeV^2

0

0.2

0.4 32GeV^2 65GeV^2 120GeV^2

0

0.2

0.4 200GeV^2 440GeV^2

x 10^{-5} 10^{-3} 10^{-5} 10^{-3} 10^{-1}

H1Preliminary

Data HERA-II

total theory uncertainty PDF variation

MRST04FF3

CTEQ5F3