0 0.1 0.2 0.3 0.4

-4 -3 -2

0 0.1 0.2 0.3 0.4

-4 -3 -2

0 0.1 0.2 0.3 0.4

-4 -3 -2

0 0.1 0.2 0.3 0.4

-4 -3 -2

0 0.1 0.2 0.3 0.4

-4 -3 -2

0 0.1 0.2 0.3 0.4

-4 -3 -2

0 0.1 0.2 0.3 0.4

-4 -3 -2

F^{cc} _ 2 Combined D* and Charm Lifetime Tag

F^{cc} _ 2 Q^2=6.5 GeV^2 Q^2=12 GeV^2 Q^2=20 GeV^2

Q^2=35 GeV^2 Q^2=60 GeV^2 Q^2=120 GeV^2

Q^2=200 GeV^2

log_{10} x

Q^2=400 GeV^2

H1Preliminary

Data HERA-II VFNS MSWT08 (Prel) VFNS MSWT08 NNLO (Prel) FFNS MRST04FF3NLO FFNS CTEQ5F3 0 0.1 0.2 0.3 0.4

-4 -3 -2