+ / Y 2y 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

)^2 , Q β, _{IP}

(x_rσ _{IP}x

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0.05 H1 Preliminary_2 = 13.5 GeV 2Q = 0.003 IPx = 0.105 β

= 920 GeV pE = 575 GeV pE = 460 GeV pE

+ / Y 2y 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

)^2 , Q β, _{IP} (x_rσ _{IP}x

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0.05 H1 Preliminary_2 = 13.5 GeV 2Q = 0.003 IPx = 0.119 β

= 920 GeV pE = 575 GeV pE = 460 GeV pE

+ / Y 2y 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

)^2 , Q β, _{IP} (x_rσ _{IP}x

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0.05 H1 Preliminary_2 = 13.5 GeV 2Q = 0.003 IPx = 0.137 β

= 920 GeV pE = 575 GeV pE = 460 GeV pE

+ / Y 2y 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

)^2 , Q β, _{IP}

(x_rσ _{IP}x

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0.05 H1 Preliminary_2 = 13.5 GeV 2Q = 0.003 IPx = 0.181 β

= 920 GeV pE = 575 GeV pE = 460 GeV pE