20

30 40 50 60 70

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-t ΜGeV^2Ν dσ/dt Μnb/GeV^2Ν

H1 HERA II DVCS pdiss (prelim.) Fit in exp(b_{pdiss}t)

H1 preliminary